1760834960253
12744,2.6.161021
1958,2.6.161203
24204,2.6.161122
16891,2.4.160519
17440,2.7.170608
7139,2.2.160203
11518,2.6.161014
6068,2.7.170109
4549,2.2.151217
18161,2.5.160804
19543,2.6.161005
11167,2.2.160119
13122,2.3.160317
20655,2.2.151117
24104,2.8.170821
