1766540964551
886,0.64.8
13130,0.64.8
18424,0.64.8
618,0.64.8
9182,0.64.8
5666,0.64.8
8000,0.64.8
6242,0.64.8
5770,0.64.8
13527,0.64.8
17652,0.64.8
